
                         BAR

Shows a bar chart of the top sixty retrieved documents and
PL's estimate of their Probable Relevance.  The top ranked
document is given a score of 100.  All other documents are
scored in relation to that top document.

Even though a query may retrieve more than sixty documents,
the horizontal axis, which shows the Ranking Numbers, only
extends out to sixty.