                              FIGURE

     FIGURE is used to display graphic images which are related to
the current document.

     FIGURE displays a menu of the available graphics on the left
side of the screen and will display other graphics on the menu through
using the the cursor up and cursor down keys.   Pageup and pagedown may
be used to move the menu ten images forward or backward.

     The F10 function key is used to exit the FIGURE program and
return to Personal Librarian.  To view the current document, press 
the RETURN key.


